                                                                                                                    -4 000

                                                                                                                    -3 000

                                                                                                                    -2 000

                                                                                                                    -1 000

0

                                                                                                                        1 000

                                                                                                                        2 000

                                                                                                                        3 000

                                                                                                                        4 000

                                                                                                                        5 000

0 5 10 15 20 25

Effectiveness difference (unit of % increase of stable patients)

Cost difference (US$)

Ray with slope

R
1

 = 173

Ray with slope R
2

= -206

                                                                               Figur 1. ICER bootstrap replicates and 95% Fieller confidence limits for the ICER .

                                                                                                            -15 000

                                                                                                            -10 000

                                                                                                                  -5 000

0

                                                                                                                      5 000

                                                                                                                10 000

                                                                                                                15 000

-600

-550

-500

-450

-400

-350

-300

-250

-200

-150

-100

-50050100

150

200

250

300

350

400

450

500

550

Willingness-to-pay prices per one more unit of effectiveness (US$)

Net benefit values (US$)

 Point estimate

 upper bound

 lower bound

p
1

 = 173
p
2

= -206

                                                                               Figur 2. Confidence intervals for the net benefit for different willingness to pay pri ces.